<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% A small test file: the top left corner of the upper rule should be
% 1in from both the top and left edges of the paper.

\nopagenumbers
\topskip=0pt

\hrule width 2in height 1mm

\vskip 4in

\hrule width 4in height 1mm

\bye
</pre></body></html>